The ICA Connection Center Window

The ICA Connection Center Window shows the currently open ICA sessions.

Click the following for more information:

  ICA Connections

  Disconnect button

  Fullscreen button

  Properties button

  Logoff button

  Terminate button

See Also

The ICA Connection Center Overview


The ICA Connection Center Overview

The Citrix ICA Win32 Client supports running published applications in seamless windows on Windows NT 3.51 SP3 or greater and Windows 9x/2000 client computers.

Seamless windows are ICA Client session windows containing published applications that client computer users have configured to run in seamless mode. A seamless windows session runs in a resizable window. Because seamless windows only contain published applications, seamless ICA connections must be network (non-serial) connections. Seamless windows ICA connections also differ from non-seamless connections in the number of published applications that can be run in a single ICA session.

When using seamless windows, users can make a single ICA connection to a Citrix server that has multiple published applications configured and then run the various published applications all in the same ICA session. Each published application appears in its own resizable window and behaves like any locally run Windows application.

The ICA Connection Center displays all ICA connections established from this client.

Note

All server and application functionality provided by buttons is also provided by the appropriate context menu activated by a right mouse click.


Active Connections
ICA Connections

The ICA Connections field displays a list of active ICA sessions. Each server entry in the list represents an ICA session. For each seamless session, below each server entry, appears a list of the published applications you are running on that server.


Logoff Button
Logoff

Terminates all published applications on the selected server and closes the ICA session.


Terminate Button
Terminate

The selected published application terminates. If you have other published applications running on that server, the ICA session remains active and the published applications remain running. If no other published applications are running on the server connection, the ICA connection to the server is terminated.


To terminate an individual published application connection

Select a published application and click Terminate. The published application terminates. If you have other published applications running on that server, the ICA session remains active and the published applications remain running. If no other published applications are running on the server connection, the ICA connection to the server is terminated.


To logoff a MetaFrame server
To logoff a server

Select a server entry from the list and click Logoff. The ICA session is ended and all published applications you are running on that server are terminated.


To exit the ICA Connection Center


Fullscreen Button
Fullscreen

The currently selected seamless connection will switch to a full screen session.  Pressing SHIFT-F2 will return this session back to seamless mode.


Disconnect Button
Disconnect

Disconnects the currently selected server session.


Properties Button
Properties

Displays ICA communication statistics for the selected server.  User name, server name and encryption level are also displayed for the currently selected session.